/*
Copyright (C) 2025 QuantumNous

This program is free software: you can redistribute it and/or modify
it under the terms of the GNU Affero General Public License as
published by the Free Software Foundation, either version 3 of the
License, or (at your option) any later version.

This program is distributed in the hope that it will be useful,
but WITHOUT ANY WARRANTY; without even the implied warranty of
MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE. See the
GNU Affero General Public License for more details.

You should have received a copy of the GNU Affero General Public License
along with this program. If not, see <https://www.gnu.org/licenses/>.

For commercial licensing, please contact support@quantumnous.com
*/

import React from 'react';
import DeploymentsTable from '../../components/table/model-deployments';
import DeploymentAccessGuard from '../../components/model-deployments/DeploymentAccessGuard';
import { useModelDeploymentSettings } from '../../hooks/model-deployments/useModelDeploymentSettings';

const ModelDeploymentPage = () => {
  const {
    loading,
    isIoNetEnabled,
    connectionLoading,
    connectionOk,
    connectionError,
    testConnection,
  } = useModelDeploymentSettings();

  return (
    <DeploymentAccessGuard
      loading={loading}
      isEnabled={isIoNetEnabled}
      connectionLoading={connectionLoading}
      connectionOk={connectionOk}
      connectionError={connectionError}
      onRetry={() => testConnection()}
    >
      <div className='min-h-full pb-16 pt-20 text-slate-900 dark:text-white'>
        <div className='mx-auto w-full max-w-[1400px] px-4 sm:px-6 lg:px-10'>
          <DeploymentsTable />
        </div>
      </div>
    </DeploymentAccessGuard>
  );
};

export default ModelDeploymentPage;
